From 1d66040712a426b2ebe1e79cc7cf5a7cd53168c4 Mon Sep 17 00:00:00 2001
From: John Ogness <john.ogness@linutronix.de>
Date: Tue, 23 Jan 2018 03:34:14 +0000
Subject: debugging-tools: fixup typos

Fixup some copy/paste errors.

Signed-off-by: John Ogness <john.ogness@linutronix.de>
---
 .../debugging-tools/pres_debugging-tools_en.tex      | 20 ++++++++++----------
 1 file changed, 10 insertions(+), 10 deletions(-)

(limited to 'application-devel/debugging-tools/pres_debugging-tools_en.tex')

diff --git a/application-devel/debugging-tools/pres_debugging-tools_en.tex b/application-devel/debugging-tools/pres_debugging-tools_en.tex
index ccbe9be..4adf4f8 100644
--- a/application-devel/debugging-tools/pres_debugging-tools_en.tex
+++ b/application-devel/debugging-tools/pres_debugging-tools_en.tex
@@ -448,7 +448,7 @@ $ MALLOC_TRACE=mem_leak.trace ./mem_leak
 \end{verbatim}
 view the trace results
 \begin{verbatim}
-$ mtrace ./mem_leak mytrace.log
+$ mtrace ./mem_leak mem_leak.trace
 
 Memory not freed:
 -----------------
@@ -466,7 +466,7 @@ With a patched mtrace, PIE can be traced by disabling ASLR.
 \begin{verbatim}
 $ gcc -fPIE -pie -g -omem_leak mem_leak.c
 $ setarch `uname -m` -R env MALLOC_TRACE=mem_leak.trace ./mem_leak
-$ setarch `uname -m` -R ./mtrace-patched ./mem_leak mytrace.log
+$ setarch `uname -m` -R ./mtrace-patched ./mem_leak mem_leak.trace
 
 Memory not freed:
 -----------------
@@ -480,21 +480,21 @@ Address   Size   Caller
 
 \begin{frame}[containsverbatim]
 \frametitle{glibc Hooks for malloc()}
-\_\_malloc\_hook:\\
+\_\_malloc\_hook:
 \begin{verbatim}
-void *function (size\_t size, const void *caller)
+void *function (size_t size, const void *caller)
 \end{verbatim}
-\_\_realloc\_hook:\\
+\_\_realloc\_hook:
 \begin{verbatim}
-void *function (void *ptr, size\_t size, const void *caller)\\
+void *function (void *ptr, size_t size, const void *caller)
 \end{verbatim}
-\_\_free\_hook:\\
+\_\_free\_hook:
 \begin{verbatim}
-void *function (void *ptr, const void *caller)\\
+void *function (void *ptr, const void *caller)
 \end{verbatim}
-\_\_memalign\_hook:\\
+\_\_memalign\_hook:
 \begin{verbatim}
-void *function (size\_t size, size\_t alignment, const void *caller)
+void *function (size_t size, size_t alignment, const void *caller)
 \end{verbatim}
 Do not use them! Use mtrace instead!
 \end{frame}
-- 
cgit v1.2.3

