From e832bf82cfd98a477867f71394fd933c59d02556 Mon Sep 17 00:00:00 2001
From: John Ogness <john.ogness@linutronix.de>
Date: Thu, 28 Feb 2019 15:47:20 +0106
Subject: embedded-devel: remove unnecessary "cut" in command

The -dM argument shows the built-in macros. Cutting the #define
from the output not only make the command unnecessarily complex,
but also works against illustrating that they are macros.

Signed-off-by: John Ogness <john.ogness@linutronix.de>
---
 application-devel/embedded-devel/pres_embedded-devel_en.tex | 10 +++++-----
 1 file changed, 5 insertions(+), 5 deletions(-)

(limited to 'application-devel/embedded-devel/pres_embedded-devel_en.tex')

diff --git a/application-devel/embedded-devel/pres_embedded-devel_en.tex b/application-devel/embedded-devel/pres_embedded-devel_en.tex
index e2f0698..99c9aa8 100644
--- a/application-devel/embedded-devel/pres_embedded-devel_en.tex
+++ b/application-devel/embedded-devel/pres_embedded-devel_en.tex
@@ -134,12 +134,12 @@ gcc -E -C hello.c
 
 show pre-defined/internal macros
 \begin{verbatim}
-$ gcc -E -dM - < /dev/null | cut -c 9- | sort
+$ gcc -E -dM - < /dev/null | sort
 [...]
-__SIZEOF_DOUBLE__ 8
-__SIZEOF_FLOAT__ 4
-__SIZEOF_INT__ 4
-__SIZEOF_LONG__ 8
+#define __SIZEOF_DOUBLE__ 8
+#define __SIZEOF_FLOAT__ 4
+#define __SIZEOF_INT__ 4
+#define __SIZEOF_LONG__ 8
 [...]
 \end{verbatim}
 \end{frame}
-- 
cgit v1.2.3

