From ce59ea8a298418b161b220df3a390b0e1fb73421 Mon Sep 17 00:00:00 2001
From: Manuel Traut <manut@linutronix.de>
Date: Thu, 29 Nov 2018 17:24:38 +0100
Subject: fix handling of numbers on slides and printouts

As mentioned in mantis #1449 slides are increasing the page number
if \pause is used. This leads to different page numbers in printout
presentations. This is fixed by using frame numbers instead of page
numbers.

The micronsult theme doesn't use any numbers. This inserts the
frame number on the bottom left.

Signed-off-by: Manuel Traut <manut@linutronix.de>
---
 configbeamer.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'configbeamer.tex')

diff --git a/configbeamer.tex b/configbeamer.tex
index f77f5f3..edbe28b 100644
--- a/configbeamer.tex
+++ b/configbeamer.tex
@@ -51,12 +51,12 @@
 
 \IfFileExists{.lxformat_microconsult}
 {
-% no copyright footer
+% footer is defined in microconsult theme
 }{
 \setbeamertemplate{footline}[text line]{\parbox{\linewidth}{
 \copyright{} \the\year\ by \insertinstitute \hfill
 \insertshortauthor \hfill
-\insertpagenumber}
+\insertframenumber}
 }
 }
 
-- 
cgit v1.2.3

