From a7980d6b80d0f6410a04c44decb2177657a2b55b Mon Sep 17 00:00:00 2001
From: Holger Dengler <dengler@linutronix.de>
Date: Wed, 17 Jan 2018 15:50:20 +0100
Subject: config: Add new configuration for printable handouts

Characteristics of printable handouts:
- no closing page
- no Linutronix headline
- all slides on a single frame
- two frames per page

Signed-off-by: Holger Dengler <dengler@linutronix.de>
---
 configprint.tex | 31 +++++++++++++++++++++++++++++++
 1 file changed, 31 insertions(+)
 create mode 100644 configprint.tex

(limited to 'configprint.tex')

diff --git a/configprint.tex b/configprint.tex
new file mode 100644
index 0000000..719e7d2
--- /dev/null
+++ b/configprint.tex
@@ -0,0 +1,31 @@
+%!TEX TS-program = xelatex
+%!TEX encoding = UTF-8 Unicode
+
+\documentclass[handout]{beamer}
+
+\usepackage{polyglossia}
+\usepackage{amsmath,amssymb}
+\usepackage{listings,color}
+\usepackage{graphicx}
+\usepackage{xltxtra,fontspec,xunicode}
+\usepackage{lxextras}
+\usepackage{pgfpages}
+
+\defaultfontfeatures{Scale=MatchLowercase}
+\setromanfont{TheMixB W5 Plain}
+\setsansfont{TheMixB W7 Bold}
+\setmonofont[Scale=0.7]{Source Code Pro}
+\linespread{0.5}
+
+\usetheme{linutronix}
+%% Reset headline for the handouts
+\defbeamertemplate*{headline}{}{}
+
+\pgfpagesuselayout{2 on 1}[a4paper,border shrink=5mm]
+
+\institute{Linutronix GmbH}
+\definecolor{lbcolor}{RGB}{255,210,150}
+
+\begin{document}
+
+\input{section}
-- 
cgit v1.2.3

