From f2c38e006eddc09247894a70e8a1403c064a052b Mon Sep 17 00:00:00 2001
From: Manuel Traut <manut@mecka.net>
Date: Wed, 15 May 2013 09:18:56 +0200
Subject: elbe-user: use correct path of install.iso

Signed-off-by: Manuel Traut <manut@mecka.net>
---
 distribution/elbe-usage/pres_elbe-usage_en.tex | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'distribution/elbe-usage/pres_elbe-usage_en.tex')

diff --git a/distribution/elbe-usage/pres_elbe-usage_en.tex b/distribution/elbe-usage/pres_elbe-usage_en.tex
index be63d54..8e37ad5 100644
--- a/distribution/elbe-usage/pres_elbe-usage_en.tex
+++ b/distribution/elbe-usage/pres_elbe-usage_en.tex
@@ -318,7 +318,8 @@ elbe setsel <xmlfile> selections.list
 \begin{frame}[fragile]
 \frametitle{ELBE command overview: elbe-setcdrom}
 \begin{verbatim}
-$ elbe setcdrom mysqueeze.xml elbe-cd.iso
+$ elbe setcdrom mysqueeze.xml \
+/home/user/elbe-test/install.iso
 \end{verbatim}
 This command removes all configured mirrors and additional urls from the XML file and sets the given ISO image as the only mirror.
 \end{frame}
-- 
cgit v1.2.3

