From 6e7e1b7172813fc4ecb60597f903dd21a4616159 Mon Sep 17 00:00:00 2001
From: John Ogness <john.ogness@linutronix.de>
Date: Tue, 19 Dec 2017 11:16:28 +0100
Subject: update yocto-advanced: sync to devel/manut/yocto

The devel/manut/yocto heavily diverted from master. Sync
with latest version 8cd4956a9b48a316eab6dc6d1b1f6cd51362fecf.

Signed-off-by: John Ogness <john.ogness@linutronix.de>
---
 distribution/yocto-advanced/yocto-local-conf.tex | 28 ------------------------
 1 file changed, 28 deletions(-)

(limited to 'distribution/yocto-advanced/yocto-local-conf.tex')

diff --git a/distribution/yocto-advanced/yocto-local-conf.tex b/distribution/yocto-advanced/yocto-local-conf.tex
index b1e2a52..5213a78 100644
--- a/distribution/yocto-advanced/yocto-local-conf.tex
+++ b/distribution/yocto-advanced/yocto-local-conf.tex
@@ -19,31 +19,3 @@ local.conf is used to configure
 \end{itemize}
 \end{frame}
 
-\begin{frame}[fragile]
-\frametitle{Yocto with local mirror}
-\begin{description}
-\item [PREMIRRORS] list of mirrors that are tried before SRC\_URI
-\item [MIRRORS] list of mirrors that are tried after SRC\_URI
-\item [BB\_FETCH\_PREMIRRORONLY = "1"] only use sources from PREMIRRORS
-\item [BB\_NO\_NETWORK = "1"] throws error instead of accessing internet
-\item [BB\_GENERATE\_MIRROR\_TARBALLS = "1"] generates a tarball that can be
-  used as mirror
-\end{description}
-\end{frame}
-
-\begin{frame}[fragile]
-\frametitle{override default config files}
-default templates can be overridden by setting TEMPLATECONF
-to e.g. meta-mini/conf during ./oe-init-buildenv.
-
-Then meta-mini/conf bblayers.conf.sample and local.conf.sample will
-be used.
-
-The default location is specified in
-
-\begin{verbatim}
-% cat .templateconf
-# Template settings
-TEMPLATECONF=${TEMPLATECONF:-meta-yocto/conf}
-\end{verbatim}
-\end{frame}
-- 
cgit v1.2.3

