From a73750e3cf2a1c6ac0b5639c6832b11f0f1f4261 Mon Sep 17 00:00:00 2001
From: John Ogness <john.ogness@linutronix.de>
Date: Tue, 15 May 2018 10:48:04 +0206
Subject: yocto-basic: show date on cover page

All slide sets show the date on the cover page. We should not
have individual slide sets that do their own thing. If dates are
not wanted, they should be generally removed (or perhaps a
configuration option when building).

John Ogness <john.ogness@linutronix.de>
---
 distribution/yocto-basic/pres_yocto-basic.tex | 1 -
 1 file changed, 1 deletion(-)

(limited to 'distribution/yocto-basic/pres_yocto-basic.tex')

diff --git a/distribution/yocto-basic/pres_yocto-basic.tex b/distribution/yocto-basic/pres_yocto-basic.tex
index f3b3b3b..40d9733 100644
--- a/distribution/yocto-basic/pres_yocto-basic.tex
+++ b/distribution/yocto-basic/pres_yocto-basic.tex
@@ -1,7 +1,6 @@
 \input{configpres}
 
 \title{YOCTO - Basics}
-\date{}
 \maketitle
 
 \begin{frame}
-- 
cgit v1.2.3

