From 835d55f87eb19a7c2b9b2da2f61b9b1932a42724 Mon Sep 17 00:00:00 2001
From: Holger Dengler <dengler@linutronix.de>
Date: Wed, 9 Jan 2019 09:14:05 +0100
Subject: themes: reduce font size for microconsult theme

The font size in the theme for microconsult is larger than in the
original linutronix theme. Therefore, in some slides there is not
enough space for all text. The font sizes in both themes are now
nearly equal, so the problem should be fixed.

Signed-off-by: Holger Dengler <dengler@linutronix.de>
---
 foreignthemes/microconsult/beamerthememicroconsult.sty | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'foreignthemes/microconsult/beamerthememicroconsult.sty')

diff --git a/foreignthemes/microconsult/beamerthememicroconsult.sty b/foreignthemes/microconsult/beamerthememicroconsult.sty
index 3b7b801..dc77984 100644
--- a/foreignthemes/microconsult/beamerthememicroconsult.sty
+++ b/foreignthemes/microconsult/beamerthememicroconsult.sty
@@ -19,9 +19,9 @@
 
 \def\NONE{none}
 
-\setromanfont[Scale=1.1]{Liberation Sans}
-\setsansfont[Scale=1.1]{Liberation Sans}
-\setmonofont[Scale=0.7]{Source Code Pro}
+\setromanfont[Scale=0.9]{Liberation Sans}
+\setsansfont[Scale=0.9]{Liberation Sans}
+\setmonofont[Scale=0.6]{Source Code Pro}
 
 \useinnertheme{circles}
 
-- 
cgit v1.2.3

