From cd97d8f436a9390549ca211bbfb3b40d8bf163fb Mon Sep 17 00:00:00 2001
From: John Ogness <john.ogness@linutronix.de>
Date: Fri, 20 Apr 2018 10:53:41 +0200
Subject: microconsult: change Arial to Liberation Sans

Liberation Sans is a free metrically equivalent drop-in replacement
for the non-free Arial. Use it instead.

This also requires users to install the fonts-liberation2 package.

Signed-off-by: John Ogness <john.ogness@linutronix.de>
---
 foreignthemes/microconsult/beamerthememicroconsult.sty | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'foreignthemes/microconsult/beamerthememicroconsult.sty')

diff --git a/foreignthemes/microconsult/beamerthememicroconsult.sty b/foreignthemes/microconsult/beamerthememicroconsult.sty
index d388757..d7386dd 100644
--- a/foreignthemes/microconsult/beamerthememicroconsult.sty
+++ b/foreignthemes/microconsult/beamerthememicroconsult.sty
@@ -19,8 +19,8 @@
 
 \def\NONE{none}
 
-\setromanfont[Scale=1.1]{Arial}
-\setsansfont[Scale=1.1]{Arial}
+\setromanfont[Scale=1.1]{Liberation Sans}
+\setsansfont[Scale=1.1]{Liberation Sans}
 \setmonofont[Scale=0.7]{Source Code Pro}
 
 \useinnertheme{circles}
-- 
cgit v1.2.3

