From fbff95a7f9cc09d79af0c8a012f3164452d7030b Mon Sep 17 00:00:00 2001
From: John Ogness <john.ogness@linutronix.de>
Date: Fri, 11 Jan 2019 14:15:30 +0106
Subject: theme: microconsult: properly position footer image

The footer image is too high causing the copyright text to be
partly cutoff. Vertically center the text.

Signed-off-by: John Ogness <john.ogness@linutronix.de>
---
 foreignthemes/microconsult/beamerthememicroconsult.sty | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'foreignthemes/microconsult/beamerthememicroconsult.sty')

diff --git a/foreignthemes/microconsult/beamerthememicroconsult.sty b/foreignthemes/microconsult/beamerthememicroconsult.sty
index c545191..1a45429 100644
--- a/foreignthemes/microconsult/beamerthememicroconsult.sty
+++ b/foreignthemes/microconsult/beamerthememicroconsult.sty
@@ -38,7 +38,7 @@
 
 %footer with author, company name, page number
 \setbeamertemplate{footline}{
-	{\hspace{10pt}\pgfuseimage{ucfooter}\vspace{7pt}}
+	{\hspace{10pt}\raisebox{-2pt}{\pgfuseimage{ucfooter}}\vspace{7pt}}
 	\textcolor{white}{\hspace{-345pt}\vspace{5pt}Copyright 2019 Linutronix GmbH}
 	\vspace{-7pt}
 }
-- 
cgit v1.2.3

