From f7038160b05b06e7fb0b0d2adfbaff0894bea068 Mon Sep 17 00:00:00 2001
From: John Ogness <john.ogness@linutronix.de>
Date: Wed, 18 Apr 2018 17:12:54 +0200
Subject: security: firewall_ex: minimize pres/print diff

The only difference between a pres and a print is the config and
tail lines (first and last lines of the .tex). Make this clear
by consolidating all other lines into the main content.

Signed-off-by: John Ogness <john.ogness@linutronix.de>
---
 security/firewall_ex/frm_ex_firewall.tex | 9 +++++++++
 1 file changed, 9 insertions(+)

(limited to 'security/firewall_ex/frm_ex_firewall.tex')

diff --git a/security/firewall_ex/frm_ex_firewall.tex b/security/firewall_ex/frm_ex_firewall.tex
index 714dc2d..67b3acf 100644
--- a/security/firewall_ex/frm_ex_firewall.tex
+++ b/security/firewall_ex/frm_ex_firewall.tex
@@ -1,3 +1,10 @@
+% ----------------------------
+\subsection{Firewall Examples}
+
+% ----------------------------
+\title{Example Firewall}
+\maketitle
+
 % ----------------------------
 \subsubsection{Initialization}
 
@@ -299,3 +306,5 @@ COMMIT
 \end{scriptsize}
 \end{frame}
 
+% ----------------------------
+\subsection{}
-- 
cgit v1.2.3

