From f7038160b05b06e7fb0b0d2adfbaff0894bea068 Mon Sep 17 00:00:00 2001
From: John Ogness <john.ogness@linutronix.de>
Date: Wed, 18 Apr 2018 17:12:54 +0200
Subject: security: firewall_ex: minimize pres/print diff

The only difference between a pres and a print is the config and
tail lines (first and last lines of the .tex). Make this clear
by consolidating all other lines into the main content.

Signed-off-by: John Ogness <john.ogness@linutronix.de>
---
 security/firewall_ex/pres_ex_firewall.tex | 11 -----------
 1 file changed, 11 deletions(-)

(limited to 'security/firewall_ex/pres_ex_firewall.tex')

diff --git a/security/firewall_ex/pres_ex_firewall.tex b/security/firewall_ex/pres_ex_firewall.tex
index e4fad99..521dd6f 100644
--- a/security/firewall_ex/pres_ex_firewall.tex
+++ b/security/firewall_ex/pres_ex_firewall.tex
@@ -1,14 +1,3 @@
 \input{configpres}
-
-\subsection{Firewall Examples}
-
-% ----------------------------
-\title{Example Firewall}
-\maketitle
-
-% ----------------------------
 \input{frm_ex_firewall}
-
-% ----------------------------
-\subsection{}
 \input{tailpres}
-- 
cgit v1.2.3

