%!TEX TS-program = xelatex
%!TEX encoding = UTF-8 Unicode

\documentclass{beamer}

\usepackage{german}
\usepackage{amsmath,amssymb}
\usepackage{listings,color}
\usepackage{graphicx}
\usepackage{xltxtra,fontspec,xunicode}

\defaultfontfeatures{Scale=MatchLowercase}
\setromanfont[Numbers=Uppercase]{TheMixB W5 Plain}
\setsansfont{TheMixB W7 Bold}
\setmonofont[Scale=0.90,Ligatures=NoCommon]{Source Code Pro}

\mode<presentation>{\usetheme{linutronix}}

\institute{Linutronix GmbH}
\definecolor{lbcolor}{RGB}{255,210,150}
\lstset{
	language=C++,
	numbers=left,
	stepnumber=1,
	numbersep=5pt,
	breaklines=true,
	breakautoindent=true,
	postbreak=\space,
	tabsize=2,
	basicstyle=\ttfamily\small,
	showspaces=false,
	showstringspaces=false,
	extendedchars=true,
	backgroundcolor=\color{lbcolor},
	keywordstyle=\bf ,
	commentstyle=\color{blue},
	stringstyle=\color{red}
}

\begin{document}

\input{section}
