%!TEX TS-program = xelatex
%!TEX encoding = UTF-8 Unicode

\documentclass[handout]{beamer}

\usepackage{polyglossia}
\usepackage{amsmath,amssymb}
\usepackage{listings,color}
\usepackage{graphicx}
\usepackage{xltxtra,fontspec,xunicode}
\usepackage{lxextras}
\usepackage{pgfpages}

\defaultfontfeatures{Scale=MatchLowercase}
\setromanfont{TheMixB W5 Plain}
\setsansfont{TheMixB W7 Bold}
\setmonofont[Scale=0.7]{Source Code Pro}
\linespread{0.5}

\usetheme{linutronix}
%% Reset headline for the handouts
\defbeamertemplate*{headline}{}{}

\pgfpagesuselayout{2 on 1}[a4paper,border shrink=5mm]

\institute{Linutronix GmbH}
\definecolor{lbcolor}{RGB}{255,210,150}

\begin{document}

\input{section}
